[#BCLog-RATELIMIT_WINDOW]
= xref:BCLog.adoc[BCLog]::RATELIMIT&lowbar;WINDOW
:relfileprefix: ../
:mrdocs:

time window after which log ratelimit stats are reset

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr auto RATELIMIT&lowbar;WINDOW = &lcub;1h&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
