[#BCLog-Logger-DefaultShrinkDebugFile]
= xref:BCLog.adoc[BCLog]::xref:BCLog/Logger.adoc[Logger]::DefaultShrinkDebugFile
:relfileprefix: ../../
:mrdocs:

Whether the debug log file should be shrunk on startup by default&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
DefaultShrinkDebugFile() const;
----

== Return Value

true if the debug log file should be shrunk by default&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
