[#BCLog-LogRateLimiter-m_reset_window]
= xref:BCLog.adoc[BCLog]::xref:BCLog/LogRateLimiter.adoc[LogRateLimiter]::m&lowbar;reset&lowbar;window
:relfileprefix: ../../
:mrdocs:

Interval after which the window is reset&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::chrono::seconds const m&lowbar;reset&lowbar;window;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
