[#BCLog-LogRateLimiter-m_max_bytes]
= xref:BCLog.adoc[BCLog]::xref:BCLog/LogRateLimiter.adoc[LogRateLimiter]::m&lowbar;max&lowbar;bytes
:relfileprefix: ../../
:mrdocs:

Maximum number of bytes logged per location per window&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint64&lowbar;t const m&lowbar;max&lowbar;bytes;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
