[#BCLog-LogRateLimiter-Stats-m_dropped_bytes]
= xref:BCLog.adoc[BCLog]::xref:BCLog/LogRateLimiter.adoc[LogRateLimiter]::xref:BCLog/LogRateLimiter/Stats.adoc[Stats]::m&lowbar;dropped&lowbar;bytes
:relfileprefix: ../../../
:mrdocs:

Number of bytes that were consumed but didn&apos;t fit in the available bytes&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint64&lowbar;t m&lowbar;dropped&lowbar;bytes = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
