[#BCLog-DEFAULT_LOG_LEVEL]
= xref:BCLog.adoc[BCLog]::DEFAULT&lowbar;LOG&lowbar;LEVEL
:relfileprefix: ../
:mrdocs:

Default global log severity level&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr auto DEFAULT&lowbar;LOG&lowbar;LEVEL = &lcub;Level&colon;&colon;Debug&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
