[#ADDR_TORV3_SIZE]
= ADDR&lowbar;TORV3&lowbar;SIZE
:mrdocs:

Size of TORv3 address (in bytes)&period; This is the length of just the address as used in BIP155, without the checksum and the version byte&period;

== Synopsis

Declared in `&lt;netaddress&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t ADDR&lowbar;TORV3&lowbar;SIZE = 32;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
