[#bsl-is_floating_point_v]
= xref:bsl.adoc[bsl]::is&lowbar;floating&lowbar;point&lowbar;v
:relfileprefix: ../
:mrdocs:

Variable template alias for `is&lowbar;floating&lowbar;point&lt;TYPE&gt;&colon;&colon;value`&period;

== Synopsis

Declared in `&lt;bslmf&lowbar;isfloatingpoint&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using std::is&lowbar;floating&lowbar;point&lowbar;v;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
