[#bsl-chrono-treat_as_floating_point_v]
= xref:bsl.adoc[bsl]::xref:bsl/chrono.adoc[chrono]::treat&lowbar;as&lowbar;floating&lowbar;point&lowbar;v
:relfileprefix: ../../
:mrdocs:

This template variable represents the result value of the `std&colon;&colon;chrono&colon;&colon;treat&lowbar;as&lowbar;floating&lowbar;point` meta&hyphen;function&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;chrono&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class TYPE&gt;
constexpr bool treat&lowbar;as&lowbar;floating&lowbar;point&lowbar;v = std&colon;&colon;chrono&colon;&colon;treat&lowbar;as&lowbar;floating&lowbar;point&lt;TYPE&gt;&colon;&colon;value;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
