[#bsl-SyncBuf_MutexUtil]
= xref:bsl.adoc[bsl]::SyncBuf&lowbar;MutexUtil
:relfileprefix: ../
:mrdocs:

Internal mutex&hyphen;related utils&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;syncbuf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct SyncBuf&lowbar;MutexUtil;
----

== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:bsl/SyncBuf_MutexUtil/get.adoc[`get`] 
| Return the mutex associated with the specified `streambuf`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
