[#bsl-Deque_BlockProctor-release]
= xref:bsl.adoc[bsl]::xref:bsl/Deque_BlockProctor.adoc[Deque&lowbar;BlockProctor]::release
:relfileprefix: ../../
:mrdocs:

Release from management the deque currently managed by this proctor&period; If no deque is currently being managed, this method has no effect&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;deque&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
release();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
