[#bsl-AllocConstants]
= xref:bsl.adoc[bsl]::AllocConstants
:relfileprefix: ../
:mrdocs:

Constants controlling the internal memory pool used by STLPort allocators&period;

== Synopsis

Declared in `&lt;bslstp&lowbar;alloc&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum AllocConstants;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `&lowbar;ALIGN` 
| Byte alignment required by the internal memory pool&period;
| `&lowbar;ALIGN&lowbar;SHIFT` 
| Base&hyphen;2 logarithm of `&lowbar;ALIGN`&period;
| `&lowbar;MAX&lowbar;BYTES` 
| Maximum object size served by the internal memory pool&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
