[#BloombergLP-bslx-TestInStreamException-dataType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/TestInStreamException.adoc[TestInStreamException]::dataType
:relfileprefix: ../../../
:mrdocs:

Return the type code that was supplied at construction of this exception object&period;

== Synopsis

Declared in `&lt;bslx&lowbar;testinstreamexception&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslx/TypeCode/Enum.adoc[TypeCode::Enum]
dataType() const;
----

== Return Value

type code supplied at construction of this exception object


[.small]#Created with https://www.mrdocs.com[MrDocs]#
