[#BloombergLP-bslx-TestInStream-inputLimit]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/TestInStream.adoc[TestInStream]::inputLimit
:relfileprefix: ../../../
:mrdocs:

Return the current number of input requests left before an exception is thrown&period; A negative value indicates that no exception is scheduled&period;

== Synopsis

Declared in `&lt;bslx&lowbar;testinstream&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
inputLimit() const;
----

== Return Value

remaining input requests before an exception&semi; negative if none


[.small]#Created with https://www.mrdocs.com[MrDocs]#
