[#BloombergLP-bslx-MarshallingUtil-_04enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/MarshallingUtil.adoc[MarshallingUtil]::Unnamed enum
:relfileprefix: ../../../
:mrdocs:

Platform&hyphen;independent wire&hyphen;format sizes (in bytes) for marshalled types&period; Note that the wire&hyphen;format size may differ from the size in memory&period;

== Synopsis

Declared in `&lt;bslx&lowbar;marshallingutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Unnamed enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `k&lowbar;SIZEOF&lowbar;INT64` 
| The wire&hyphen;format size (in bytes) of a 64&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT56` 
| The wire&hyphen;format size (in bytes) of a 56&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT48` 
| The wire&hyphen;format size (in bytes) of a 48&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT40` 
| The wire&hyphen;format size (in bytes) of a 40&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT32` 
| The wire&hyphen;format size (in bytes) of a 32&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT24` 
| The wire&hyphen;format size (in bytes) of a 24&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT16` 
| The wire&hyphen;format size (in bytes) of a 16&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;INT8` 
| The wire&hyphen;format size (in bytes) of an 8&hyphen;bit integer&period;
| `k&lowbar;SIZEOF&lowbar;FLOAT64` 
| The wire&hyphen;format size (in bytes) of a 64&hyphen;bit floating&hyphen;point number&period;
| `k&lowbar;SIZEOF&lowbar;FLOAT32` 
| The wire&hyphen;format size (in bytes) of a 32&hyphen;bit floating&hyphen;point number&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
