[#BloombergLP-bslx-InStreamFunctions-IsNotEnumType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/InStreamFunctions.adoc[InStreamFunctions]::IsNotEnumType
:relfileprefix: ../../../
:mrdocs:

Tag type selecting the non&hyphen;enumeration overload of `bdexStreamInImp`&period;

== Synopsis

Declared in `&lt;bslx&lowbar;instreamfunctions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct IsNotEnumType;
----

== Description

This `struct`, together with `IsEnumType` (above), is used to distinguish enumeration types from other types in function overload resolution&period; This `struct` contains no interface or implementation by design, and is meant for internal use only&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
