[#BloombergLP-bslx-InStreamFunctions-InStreamFunctions_AccessorHelper-getArray-015]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/InStreamFunctions.adoc[InStreamFunctions]::xref:BloombergLP/bslx/InStreamFunctions/InStreamFunctions_AccessorHelper.adoc[InStreamFunctions&lowbar;AccessorHelper]::getArray
:relfileprefix: ../../../../
:mrdocs:

Load `length` `bsls&colon;&colon;Types&colon;&colon;Uint64` values from `stream` into `result`&period;

== Synopsis

Declared in `&lt;bslx&lowbar;instreamfunctions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
STREAM&
getArray(
    STREAM& stream,
    xref:BloombergLP/bsls/Types/Uint64.adoc[bsls::Types::Uint64]* result,
    int length);
----

== Description

Load into the specified `result` the specified `length` values read from the specified `stream`, and return a reference to `stream`&period; If `stream` is initially invalid, `&ast;result` is unchanged&period; If `stream` becomes invalid during this operation, the contents of `result` have an undefined, but valid, state&period;

== Return Value

a reference to `stream`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *stream*
| input stream from which to read
| *result*
| array to receive the unexternalized values
| *length*
| number of values to read into `result`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
