[#BloombergLP-bslx-GenericInStream-getUint8-06]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/GenericInStream.adoc[GenericInStream]::getUint8
:relfileprefix: ../../../
:mrdocs:

`getUint8` overloads

== Synopses

Declared in `&lt;bslx&lowbar;genericinstream&period;h&gt;`

Extract the next one&hyphen;byte unsigned integer into the specified `variable`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslx/GenericInStream.adoc[GenericInStream&lt;STREAMBUF&gt;]&
xref:BloombergLP/bslx/GenericInStream/getUint8-0f.adoc[getUint8](char& variable);
----

[.small]#xref:BloombergLP/bslx/GenericInStream/getUint8-0f.adoc[_» more&period;&period;&period;_]#

Same as the related overload for `unsigned char&amp; variable`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslx/GenericInStream.adoc[GenericInStream&lt;STREAMBUF&gt;]&
xref:BloombergLP/bslx/GenericInStream/getUint8-08.adoc[getUint8](unsigned char& variable);
----

[.small]#xref:BloombergLP/bslx/GenericInStream/getUint8-08.adoc[_» more&period;&period;&period;_]#

== Return Value

a reference to this stream

== Parameters

[cols="1,4"]
|===
| Name| Description
| *variable*
| destination for the extracted value
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
