[#BloombergLP-bslx-ByteInStream-isEmpty]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/ByteInStream.adoc[ByteInStream]::isEmpty
:relfileprefix: ../../../
:mrdocs:

Return `true` if this stream is empty, and `false` otherwise&period;

== Synopsis

Declared in `&lt;bslx&lowbar;byteinstream&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isEmpty() const;
----

== Description

Return `true` if this stream is empty, and `false` otherwise&period; Note that this function enables higher&hyphen;level types to verify that, after successfully reading all expected data, no data remains&period;

== Return Value

`true` if empty&semi; `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
