[#BloombergLP-bsltf-TestValuesArray-resetIterators]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/TestValuesArray.adoc[TestValuesArray]::resetIterators
:relfileprefix: ../../../
:mrdocs:

Make all iterators dereferenceable and comparable again&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;testvaluesarray&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
resetIterators();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
