[#BloombergLP-bsltf-TestValuesArray-privateEnd-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/TestValuesArray.adoc[TestValuesArray]::privateEnd
:relfileprefix: ../../../
:mrdocs:

Return a `sentinel` referring to one position past the end of the sequence maintained by this container&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;testvaluesarray&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsltf/TestValuesArray/sentinel.adoc[TestValuesArray&lt;VALUE, ALLOCATOR, CONVERTER, USE&lowbar;SENTINEL&gt;::sentinel]
privateEnd(xref:BloombergLP/bsltf/TestValuesArray/sentinel.adoc[sentinel] unused);
----

== Return Value

a `sentinel` referring to one position past the end

== Parameters

[cols="1,4"]
|===
| Name| Description
| *unused*
| unused overload&hyphen;resolution tag
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
