[#BloombergLP-bsltf-TestValuesArray-end-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/TestValuesArray.adoc[TestValuesArray]::end
:relfileprefix: ../../../
:mrdocs:

Return an iterator or sentinel past the end of this container&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;testvaluesarray&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsltf/TestValuesArray/EndReturnType.adoc[TestValuesArray&lt;VALUE, ALLOCATOR, CONVERTER, USE&lowbar;SENTINEL&gt;::EndReturnType]
end();
----

== Description

Return an iterator (sentinel) referencing one position past the end of the sequence of `VALUE` objects maintained by this container&period; The return type is determined by (template) parameter `USE&lowbar;SENTINEL` and `USE&lowbar;SENTINEL` defaults to `false` (i&period;e&period;, `end()` returns an `iterator`)&period;

== Return Value

an iterator or sentinel past the end of this container


[.small]#Created with https://www.mrdocs.com[MrDocs]#
