[#BloombergLP-bsltf-TemplateTestFacility_CompareHelper-areNotEqual-05]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/TemplateTestFacility_CompareHelper.adoc[TemplateTestFacility&lowbar;CompareHelper]::areNotEqual
:relfileprefix: ../../../
:mrdocs:

Return `true` if the data values of the non&hyphen;comparable objects differ&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;templatetestfacility&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
areNotEqual(
    xref:BloombergLP/bsltf/NonEqualComparableTestType.adoc[NonEqualComparableTestType] const& lhs,
    xref:BloombergLP/bsltf/NonEqualComparableTestType.adoc[NonEqualComparableTestType] const& rhs);
----

== Return Value

`true` if the data values differ, else `false`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand operand
| *rhs*
| right&hyphen;hand operand
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
