[#BloombergLP-bsltf-StdTestAllocator-0e-2constructor-08]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/StdTestAllocator-0e.adoc[StdTestAllocator&lt;void&gt;]::StdTestAllocator
:relfileprefix: ../../../
:mrdocs:

Constructors

== Synopses

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

Create a `StdTestAllocator` object&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsltf/StdTestAllocator-0e/2constructor-0e.adoc[StdTestAllocator]();
----

[.small]#xref:BloombergLP/bsltf/StdTestAllocator-0e/2constructor-0e.adoc[_» more&period;&period;&period;_]#

Create a `StdTestAllocator` object&period; Note that this object will compare equal to the default constructed object because, because this type has no state&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class BDE&lowbar;OTHER&lowbar;TYPE&gt;
xref:BloombergLP/bsltf/StdTestAllocator-0e/2constructor-0f.adoc[StdTestAllocator](xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator&lt;BDE&lowbar;OTHER&lowbar;TYPE&gt;] const& original);
----

[.small]#xref:BloombergLP/bsltf/StdTestAllocator-0e/2constructor-0f.adoc[_» more&period;&period;&period;_]#

== Parameters

[cols="1,4"]
|===
| Name| Description
| *original*
| allocator used to initialize this object (ignored)
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
