[#BloombergLP-bsls-operator_not_eq-0a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Inequality operators

== Synopses

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

Return `true` if the specified `lhs` and `rhs` intervals are not equal&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-05.adoc[operator!&equals;](
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& lhs,
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-05.adoc[_» more&period;&period;&period;_]#

Same as the preceding overload&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-0ba.adoc[operator!&equals;](
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& lhs,
    double rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-0ba.adoc[_» more&period;&period;&period;_]#

Same as the preceding overload&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-0b7.adoc[operator!&equals;](
    double lhs,
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-0b7.adoc[_» more&period;&period;&period;_]#

== Return Value

`true` if `lhs` and `rhs` do not have the same value&semi; `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand time interval
| *rhs*
| right&hyphen;hand time interval
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
