[#BloombergLP-bsls-OutputRedirector-load]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/OutputRedirector.adoc[OutputRedirector]::load
:relfileprefix: ../../../
:mrdocs:

Read captured output into the scratch buffer&period;

== Synopsis

Declared in `&lt;bsls&lowbar;outputredirector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
load();
----

== Description

Return `true` if all captured output was successfully loaded, and `false` otherwise&period; Note that captured output is allowed to have zero length&period; The behavior is undefined unless `enable` has been previously called successfully (after the latest call to `disable`, if `disable` has been called successfully)&period;

== Return Value

`true` if all captured output was loaded&semi; `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
