[#BloombergLP-bsls-FuzzTestHandlerGuard-getOriginalReviewHandler]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/FuzzTestHandlerGuard.adoc[FuzzTestHandlerGuard]::getOriginalReviewHandler
:relfileprefix: ../../../
:mrdocs:

Return the original review handler&period;

== Synopsis

Declared in `&lt;bsls&lowbar;fuzztest&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/Review/ViolationHandler-06.adoc[Review::ViolationHandler]
getOriginalReviewHandler();
----

== Return Value

review&hyphen;failure handler that was installed when this guard was created


[.small]#Created with https://www.mrdocs.com[MrDocs]#
