[#BloombergLP-bslmt-ChronoUtil-isMatchingClock-03]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ChronoUtil.adoc[ChronoUtil]::xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-01.adoc[isMatchingClock]&lt;steady&lowbar;clock&gt;
:relfileprefix: ../../../
:mrdocs:

Return whether `steady&lowbar;clock` matches the specified `clockType`&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;chronoutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;&gt;
bool
xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-01.adoc[isMatchingClock]&lt;steady&lowbar;clock&gt;(xref:BloombergLP/bsls/SystemClockType/Enum.adoc[bsls::SystemClockType::Enum] clockType);
----

== Description

Return `true` if the specified `clockType` is `bsls&colon;&colon;SystemClockType&colon;&colon;e&lowbar;MONOTONIC`, and `false` otherwise&period;

== Return Value

`true` if `clockType` is `e&lowbar;MONOTONIC`, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *clockType*
| system clock type to compare against `steady&lowbar;clock`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
