[#BloombergLP-bslmf-NthParameter_Sentinel]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmf.adoc[bslmf]::NthParameter&lowbar;Sentinel
:relfileprefix: ../../
:mrdocs:

Sentinel type used internally by `NthParameter` (declared but not defined)&period;

== Synopsis

Declared in `&lt;bslmf&lowbar;nthparameter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct NthParameter&lowbar;Sentinel;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
