[#BloombergLP-bslmf-ContainerCompatibleRange]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmf.adoc[bslmf]::ContainerCompatibleRange
:relfileprefix: ../../
:mrdocs:

Concept that `t&lowbar;RANGE` is an input range of values convertible to `t&lowbar;TYPE`&period;

== Synopsis

Declared in `&lt;bslmf&lowbar;containercompatiblerange&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    typename t&lowbar;RANGE,
    typename t&lowbar;TYPE&gt;
concept ContainerCompatibleRange = std&colon;&colon;ranges&colon;&colon;input&lowbar;range&lt;t&lowbar;RANGE&gt;
 &amp;&amp; std&colon;&colon;convertible&lowbar;to&lt;std&colon;&colon;ranges&colon;&colon;range&lowbar;reference&lowbar;t&lt;t&lowbar;RANGE&gt;, t&lowbar;TYPE&gt;;
----

== Description

Require that (template parameter) `t&lowbar;RANGE` meets the requirements of input range and that the values referenced by the iterators of that range type have the same type or are convertible to the (template parameter) `t&lowbar;TYPE`&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
