[#BloombergLP-bslma-operator_not_eq-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` unless the specified `lhs` is a proxy for `rhs`&period;

== Synopsis

Declared in `&lt;bslma&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class TYPE&gt;
bool
operator!&equals;(
    xref:BloombergLP/bslma/StdTestAllocator.adoc[StdTestAllocator&lt;TYPE&gt;] const& lhs,
    xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator] const* rhs);
----

== Description

Return `true` unless the specified `lhs` is a proxy for the specified `rhs`, in which case return `false`&period;

== Return Value

`true` unless `lhs` is a proxy for `rhs`&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| The left&hyphen;hand test allocator operand&period;
| *rhs*
| The right&hyphen;hand test allocator pointer operand&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
