[#BloombergLP-bslma-TestAllocator-unsetFillPattern]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator]::unsetFillPattern
:relfileprefix: ../../../
:mrdocs:

Unset the fill pattern for this test allocator&period; After calling this method, newly allocated memory will not be initialized with any fill pattern&period;

== Synopsis

Declared in `&lt;bslma&lowbar;testallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
unsetFillPattern();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
