[#BloombergLP-bslma-StdTestAllocator-reference]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/StdTestAllocator.adoc[StdTestAllocator]::reference
:relfileprefix: ../../../
:mrdocs:

Alias for a modifiable reference to the value type&period;

== Synopsis

Declared in `&lt;bslma&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef bsl::conditional&lt;bsl&colon;&colon;is&lowbar;void&lt;TYPE&gt;&colon;&colon;value, void, TYPE&&gt;::type reference;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
