[#BloombergLP-bslma-StdTestAllocator-address-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/StdTestAllocator.adoc[StdTestAllocator]::address
:relfileprefix: ../../../
:mrdocs:

Return the address of the object referred to by the specified `x`&period;

== Synopsis

Declared in `&lt;bslma&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslma/StdTestAllocator/pointer.adoc[StdTestAllocator&lt;TYPE&gt;::pointer]
address(xref:BloombergLP/bslma/StdTestAllocator/reference.adoc[reference] x) const;
----

== Description

Return the address of the object referred to by the specified `x`, even if the (template parameter) `TYPE` overloads the unary `operator&amp;`&period;

== Return Value

pointer to `x`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *x*
| The object whose address is returned&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
