[#BloombergLP-bslma-StdTestAllocator-2constructor-06]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/StdTestAllocator.adoc[StdTestAllocator]::StdTestAllocator
:relfileprefix: ../../../
:mrdocs:

Create a proxy that forwards to the default test allocator&period;

== Synopsis

Declared in `&lt;bslma&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
StdTestAllocator();
----

== Description

Create a proxy object which will forward allocation calls to the object pointed to by `bslma&colon;&colon;Default&colon;&colon;defaultAllocator()`&period; The default allocator must be a `bslma&colon;&colon;TestAllocator` (or a type derived from it)&period; Postcondition&colon; &grave; this&hyphen;&gt;mechanism() &equals;&equals; bslma&colon;&colon;Default&colon;&colon;defaultAllocator()&semi; &grave;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
