[#BloombergLP-bslma-Default_NewDeleteSetter-2constructor-00]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/Default_NewDeleteSetter.adoc[Default&lowbar;NewDeleteSetter]::Default&lowbar;NewDeleteSetter
:relfileprefix: ../../../
:mrdocs:

This type is not copyable&period;

== Synopsis

Declared in `&lt;bslma&lowbar;default&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
Default&lowbar;NewDeleteSetter(xref:BloombergLP/bslma/Default_NewDeleteSetter.adoc[Default&lowbar;NewDeleteSetter] const& original) = delete;
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *original*
| unused source object (deleted)
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
