[#BloombergLP-bslfmt-TestSpecificationGenerator_Option-nextState]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator_Option.adoc[TestSpecificationGenerator&lowbar;Option]::nextState
:relfileprefix: ../../../
:mrdocs:

Switch the state of this object to the next one&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
bool
nextState() = 0;
----

== Return Value

`true` if the option cycle has not completed, and `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
