[#BloombergLP-bslfmt-TestSpecificationGenerator_Option-nextOption]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator_Option.adoc[TestSpecificationGenerator&lowbar;Option]::nextOption
:relfileprefix: ../../../
:mrdocs:

Return the pointer to the next item in the list of generator options if such an object exists and null otherwise&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslfmt/TestSpecificationGenerator_Option.adoc[TestSpecificationGenerator&lowbar;Option]*
nextOption() const;
----

== Return Value

pointer to the next option, or null if none exists


[.small]#Created with https://www.mrdocs.com[MrDocs]#
