[#BloombergLP-bslfmt-TestSpecificationGenerator-nestedWidthVariant]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::nestedWidthVariant
:relfileprefix: ../../../
:mrdocs:

Return the current nested width variant&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslfmt/TestSpecificationGenerator/NestedVariant.adoc[TestSpecificationGenerator&lt;t&lowbar;CHAR&gt;::NestedVariant]
nestedWidthVariant() const;
----

== Return Value

current nested width variant


[.small]#Created with https://www.mrdocs.com[MrDocs]#
