[#BloombergLP-bslfmt-TestSpecificationGenerator-alignment-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::alignment
:relfileprefix: ../../../
:mrdocs:

Return the current alignment type&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslfmt/TestSpecificationGenerator/Alignment-06.adoc[TestSpecificationGenerator&lt;t&lowbar;CHAR&gt;::Alignment]
alignment() const;
----

== Return Value

current alignment type


[.small]#Created with https://www.mrdocs.com[MrDocs]#
