[#BloombergLP-bslfmt-TestSpecificationGenerator-Sign-0c]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::Sign
:relfileprefix: ../../../
:mrdocs:

Sign option values corresponding to format sign characters&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Sign;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `e&lowbar;SIGN&lowbar;DEFAULT` 
| No sign option specified&period;
| `e&lowbar;SIGN&lowbar;POSITIVE` 
| Always show sign (`&plus;`)&period;
| `e&lowbar;SIGN&lowbar;NEGATIVE` 
| Show sign only for negative values (`&hyphen;`)&period;
| `e&lowbar;SIGN&lowbar;SPACE` 
| Use a space for positive values (` `)&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
