[#BloombergLP-bslfmt-TestSpecificationGenerator-2constructor]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::TestSpecificationGenerator
:relfileprefix: ../../../
:mrdocs:

Create a generator object&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
TestSpecificationGenerator(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

== Description

Optionally specify the `basicAllocator` to supply memory&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| optional allocator used to supply memory
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
