[#BloombergLP-bdlt-Iso8601UtilConfiguration-defaultConfiguration]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/Iso8601UtilConfiguration.adoc[Iso8601UtilConfiguration]::defaultConfiguration
:relfileprefix: ../../../
:mrdocs:

Return the value of the process&hyphen;wide `Iso8601UtilConfiguration` that is currently in effect&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;iso8601utilconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bdlt/Iso8601UtilConfiguration.adoc[Iso8601UtilConfiguration]
defaultConfiguration();
----

== Return Value

the process&hyphen;wide configuration currently in effect


[.small]#Created with https://www.mrdocs.com[MrDocs]#
