[#BloombergLP-bdlt-Iso8601Util-ssize_t]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/Iso8601Util.adoc[Iso8601Util]::ssize&lowbar;t
:relfileprefix: ../../../
:mrdocs:

Signed size type used by this component&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;iso8601util&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef std::ptrdiff&lowbar;t ssize&lowbar;t;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
