[#BloombergLP-bdlt-FixUtilConfiguration-setFractionalSecondPrecision]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/FixUtilConfiguration.adoc[FixUtilConfiguration]::setFractionalSecondPrecision
:relfileprefix: ../../../
:mrdocs:

Set the `fractionalSecondPrecision` attribute of this object to the specified `value`&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;fixutilconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setFractionalSecondPrecision(int value);
----

== Description

The behavior is undefined unless `0 &lt;&equals; value` and `6 &gt;&equals; value`&period; Note that the FIX protocol allows for much higher precision&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *value*
| fractional&hyphen;second digit count in the range `&lsqb;0 &period;&period; 6&rsqb;`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
