[#BloombergLP-bdlt-DatetimeInterval-k_MILLISECONDS_MAX]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/DatetimeInterval.adoc[DatetimeInterval]::k&lowbar;MILLISECONDS&lowbar;MAX
:relfileprefix: ../../../
:mrdocs:

The maximum interval that is representable by a `DatetimeInterval`, in milliseconds&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;datetimeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64] const k&lowbar;MILLISECONDS&lowbar;MAX = 185542587187199999LL;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
