[#BloombergLP-bdls-FilesystemUtil_WindowsImpUtil-k_WINDOWS_TICKS_PER_MICROSECOND]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdls.adoc[bdls]::xref:BloombergLP/bdls/FilesystemUtil_WindowsImpUtil.adoc[FilesystemUtil&lowbar;WindowsImpUtil]::k&lowbar;WINDOWS&lowbar;TICKS&lowbar;PER&lowbar;MICROSECOND
:relfileprefix: ../../../
:mrdocs:

Windows ticks per microsecond&period;

== Synopsis

Declared in `&lt;bdls&lowbar;filesystemutil&lowbar;windowsimputil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64] const k&lowbar;WINDOWS&lowbar;TICKS&lowbar;PER&lowbar;MICROSECOND = bdlt&colon;&colon;TimeUnitRatio&colon;&colon;k&lowbar;NANOSECONDS&lowbar;PER&lowbar;MICROSECOND &sol;
                           k&lowbar;NANOSECONDS&lowbar;PER&lowbar;WINDOWS&lowbar;TICK;
----

== Description

The number of Windows FILETIME ticks in one microsecond&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
