[#BloombergLP-bdls-FilesystemUtil_WindowsImpUtil-k_NANOSECONDS_PER_WINDOWS_TICK]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdls.adoc[bdls]::xref:BloombergLP/bdls/FilesystemUtil_WindowsImpUtil.adoc[FilesystemUtil&lowbar;WindowsImpUtil]::k&lowbar;NANOSECONDS&lowbar;PER&lowbar;WINDOWS&lowbar;TICK
:relfileprefix: ../../../
:mrdocs:

Nanoseconds per Windows tick&period;

== Synopsis

Declared in `&lt;bdls&lowbar;filesystemutil&lowbar;windowsimputil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64] const k&lowbar;NANOSECONDS&lowbar;PER&lowbar;WINDOWS&lowbar;TICK = 100;
----

== Description

The number of nanoseconds represented by one Windows FILETIME tick&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
