[#BloombergLP-bdlmt-Throttle_InitHelper-k_msaValue]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/Throttle_InitHelper.adoc[Throttle&lowbar;InitHelper]::k&lowbar;msaValue
:relfileprefix: ../../../
:mrdocs:

Compile&hyphen;time maximum simultaneous actions value for initialization macros&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;throttle&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const k&lowbar;msaValue = 0 &equals;&equals; t&lowbar;NANOSECONDS&lowbar;PER&lowbar;ACTION
                                      ? INT&lowbar;MAX
                                      &colon; t&lowbar;MAX&lowbar;SIMULTANEOUS&lowbar;ACTIONS;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
