[#BloombergLP-bdlmt-ThreadPool-minThreads]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/ThreadPool.adoc[ThreadPool]::minThreads
:relfileprefix: ../../../
:mrdocs:

Return the minimum number of threads that must be started at any given time&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;threadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
minThreads() const;
----

== Return Value

the configured minimum number of worker threads


[.small]#Created with https://www.mrdocs.com[MrDocs]#
